CREATE TABLE `eip_cable_test_data` (
  `id` BIGINT NOT NULL AUTO_INCREMENT COMMENT '主键',
  `cable_type` VARCHAR(50) DEFAULT NULL COMMENT '线缆类型编码',
  `cable_type_name` VARCHAR(100) DEFAULT NULL COMMENT '线缆类型名称',
  `sample_code` VARCHAR(100) DEFAULT NULL COMMENT '样品编号',
  `product_name` VARCHAR(200) DEFAULT NULL COMMENT '产品名称',
  `spec_model` VARCHAR(200) DEFAULT NULL COMMENT '规格型号',
  `test_type` VARCHAR(100) DEFAULT NULL COMMENT '试验类型',
  `test_result` VARCHAR(100) DEFAULT NULL COMMENT '试验结果',
  `raw_material` VARCHAR(500) DEFAULT NULL COMMENT '原材料',
  `process_inspection` VARCHAR(500) DEFAULT NULL COMMENT '过程检',
  `final_inspection` VARCHAR(500) DEFAULT NULL COMMENT '成品检',
  `test_date` DATE DEFAULT NULL COMMENT '试验时间',
  `source_system` VARCHAR(100) DEFAULT NULL COMMENT '来源系统',
  `sync_batch_no` VARCHAR(100) DEFAULT NULL COMMENT '同步批次号',
  `sync_status` TINYINT DEFAULT '1' COMMENT '同步状态：0失败，1成功',
  `remark` VARCHAR(500) DEFAULT NULL COMMENT '备注',
  `create_by` VARCHAR(100) DEFAULT NULL COMMENT '创建人',
  `update_by` VARCHAR(100) DEFAULT NULL COMMENT '修改人',
  `create_time` DATETIME DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `update_time` DATETIME DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '更新时间',
  PRIMARY KEY (`id`),
  KEY `idx_cable_type` (`cable_type`),
  KEY `idx_sample_code` (`sample_code`),
  KEY `idx_test_date` (`test_date`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_unicode_ci COMMENT='EIP线缆试验数据表';

INSERT INTO `sys_menu`
(`menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `route_name`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `remark`)
VALUES
('EIP线缆对接', 0, 14, 'quality-eip-cable', 'quality/eipCable/index', NULL, 'QualityEipCable', '1', '0', 'C', '0', '0', 'quality:eipCable:list', 'guide', 'admin', NOW(), '质量管理-线缆类EIP对接');
