-- 设备保养表新增验收人相关字段
ALTER TABLE `device_maintenance`
    ADD COLUMN `acceptance_name` VARCHAR(100) NULL COMMENT '验收人' AFTER `spare_parts_ids`,
    ADD COLUMN `acceptance_time` DATETIME NULL COMMENT '验收时间' AFTER `acceptance_name`,
    ADD COLUMN `acceptance_remark` VARCHAR(500) NULL COMMENT '验收备注' AFTER `acceptance_time`;

-- 设备保养定时任务表新增是否启用字段
ALTER TABLE `maintenance_task`
    ADD COLUMN `is_enabled` TINYINT(1) NULL DEFAULT 1 COMMENT '是否启用 0-禁用 1-启用' AFTER `is_active`;