-- 质量检验规则：全检/抽检 + 抽检比例
-- 2026-06-17

-- 检测标准主表：新增检验规则和抽检比例
ALTER TABLE quality_test_standard ADD COLUMN inspect_rule INT DEFAULT 0 COMMENT '检验规则: 0=全检, 1=抽检';
ALTER TABLE quality_test_standard ADD COLUMN sample_ratio DECIMAL(5,2) DEFAULT NULL COMMENT '抽检比例(百分比), 仅inspect_rule=1时有效, 如10表示10%';

-- 质检记录表：新增检验规则、抽检比例、抽检数量
ALTER TABLE quality_inspect ADD COLUMN inspect_rule INT DEFAULT NULL COMMENT '检验规则: 0=全检, 1=抽检';
ALTER TABLE quality_inspect ADD COLUMN sample_ratio DECIMAL(5,2) DEFAULT NULL COMMENT '抽检比例(百分比), 仅inspectRule=1时有效';
ALTER TABLE quality_inspect ADD COLUMN sample_quantity DECIMAL(16,2) DEFAULT NULL COMMENT '抽检数量, 仅inspectRule=1时有效';
