-- ----------------------------
-- 7、 存储已暂停的 Trigger 组的信息
-- ----------------------------
DROP TABLE IF EXISTS QRTZ_PAUSED_TRIGGER_GRPS;

CREATE TABLE QRTZ_PAUSED_TRIGGER_GRPS
(
    sched_name    VARCHAR(120) NOT NULL,    -- 调度名称
    trigger_group VARCHAR(200) NOT NULL,    -- qrtz_triggers表trigger_group的外键
    PRIMARY KEY (sched_name, trigger_group) -- 主键
);

COMMENT ON TABLE QRTZ_PAUSED_TRIGGER_GRPS IS '暂停的触发器表';
COMMENT ON COLUMN QRTZ_PAUSED_TRIGGER_GRPS.sched_name IS '调度名称';
COMMENT ON COLUMN QRTZ_PAUSED_TRIGGER_GRPS.trigger_group IS 'qrtz_triggers表trigger_group的外键';







